; wsutil.def
; $Id$

; Add symbols that should be exported out of libwsutil.dll
;
; DATA symbols must be declared WS_VAR_IMPORT in the header file!
;
; NOTE: TABS DON'T WORK IN THIS FILE, USE SPACES INSTEAD!!!
;
EXPORTS

mpa_bitrate
mpa_frequency
mpa_layer
mpa_padding
mpa_samples
mpa_version

ws_stdio_open
ws_stdio_rename
ws_stdio_mkdir
ws_stdio_stat
ws_stdio_unlink
ws_stdio_remove
ws_stdio_fopen
ws_stdio_freopen
