From f7e9a795a8575c8170346e878b898efe1e5be304 Mon Sep 17 00:00:00 2001
From: Gerald Combs <gerald@wireshark.org>
Date: Mon, 24 Aug 2015 12:33:49 -0700
Subject: Add per-dialog progress frames.

Add ProgressFame::addToButtonBox, which violates the UX guidelines on
every platform we support by inserting a ProgressFrame into a
QDialogButtonBox.

Call addToButtonBox in the constructors of a bunch of dialogs.

Change-Id: I33ac5fd7a976ee6e0527de569a5c4b528980dae1
Reviewed-on: https://code.wireshark.org/review/10242
Petri-Dish: Gerald Combs <gerald@wireshark.org>
Tested-by: Petri Dish Buildbot <buildbot-no-reply@wireshark.org>
Reviewed-by: Gerald Combs <gerald@wireshark.org>
---
 docbook/release-notes.asciidoc | 6 ++++++
 1 file changed, 6 insertions(+)

(limited to 'docbook/release-notes.asciidoc')

diff --git a/docbook/release-notes.asciidoc b/docbook/release-notes.asciidoc
index 5406746b77..12bbd67a4e 100644
--- a/docbook/release-notes.asciidoc
+++ b/docbook/release-notes.asciidoc
@@ -21,6 +21,12 @@ used for troubleshooting, analysis, development and education.
 
 === New and Updated Features
 
+The following features are new (or have been significantly updated)
+since version 1.99.8:
+
+* Qt port:
+** Most dialogs now have a cancellable progress bar.
+
 The following features are new (or have been significantly updated)
 since version 1.99.7:
 
-- 
cgit v1.2.3

