From df088de18b9a2375f6797ac4c62a6d29aa49d00f Mon Sep 17 00:00:00 2001
From: Gerald Combs <gerald@wireshark.org>
Date: Sun, 4 Feb 2018 11:39:56 -0800
Subject: Docs: Make our AsciiDoc markup more compatible with AsciiDoctor.

Start using markup that is preferred by Asciidoctor but compatible with
both generators.

Add a missing "cpp" attribute and set a couple of Asciidoctor-specific
compatibility attributes.

Change-Id: Iff4c31362e4493b97a85f46db2c39b18c336536f
Reviewed-on: https://code.wireshark.org/review/25600
Reviewed-by: Gerald Combs <gerald@wireshark.org>
---
 docbook/attributes.asciidoc | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'docbook/attributes.asciidoc')

diff --git a/docbook/attributes.asciidoc b/docbook/attributes.asciidoc
index 5bd2862edc..f0b2cbcf45 100644
--- a/docbook/attributes.asciidoc
+++ b/docbook/attributes.asciidoc
@@ -1,6 +1,10 @@
 // Common attributes
 
 :wireshark-version: 2.5.0
+// We're migrating from AsciiDoc.
+:compat-mode:
+// Required for btn, kbd:, and menu: macros.
+:experimental:
 
 //
 // URLs
-- 
cgit v1.2.3

