From 676478c8d3f8d2af0648e7db8264ce9bb5807387 Mon Sep 17 00:00:00 2001
From: Gerald Combs <gerald@wireshark.org>
Date: Thu, 18 Jan 2024 14:23:22 -0800
Subject: epan: Use an ellipsis to indicate truncated fields
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Show truncated fields as "Field name […]: data" instead of "Field name
[truncated]: data". This lets us show a few more characters of data.
---
 doc/release-notes.adoc | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'doc/release-notes.adoc')

diff --git a/doc/release-notes.adoc b/doc/release-notes.adoc
index a00def5d23..b2233fd803 100644
--- a/doc/release-notes.adoc
+++ b/doc/release-notes.adoc
@@ -114,6 +114,8 @@ The following features are new (or have been significantly updated) since versio
 * The binary plugins folder path no longer uses an X.Y version component. Plugins
   are required to add the ABI version to the file name.
 
+* Truncated fields in the detail view are now displayed as "Field name […]: data" instead of "Field name [truncated]: data"
+
 === Removed Features and Support
 
 * The tshark `-G` option with no argument is deprecated and will be removed in
-- 
cgit v1.2.3

