:gfdl-enabled:

OsmoTRX User Manual
====================
Pau Espin Pedrol <pespin@sysmocom.de>


include::./common/chapters/preface.adoc[]

include::{srcdir}/chapters/overview.adoc[]

include::{srcdir}/chapters/running.adoc[]

include::./common/chapters/control_if.adoc[]

include::{srcdir}/chapters/control.adoc[]

include::./common/chapters/vty.adoc[]

include::./common/chapters/logging.adoc[]

include::{srcdir}/chapters/counters.adoc[]

include::{srcdir}/chapters/configuration.adoc[]

include::{srcdir}/chapters/trx-architectures.adoc[]

include::{srcdir}/chapters/trx-devices.adoc[]

include::{srcdir}/chapters/trx-backends.adoc[]

include::{srcdir}/chapters/code-architecture.adoc[]

include::./common/chapters/vty_cpu_sched.adoc[]

include::./common/chapters/trx_if.adoc[]

include::./common/chapters/port_numbers.adoc[]

include::./common/chapters/bibliography.adoc[]

include::./common/chapters/glossary.adoc[]

include::./common/chapters/gfdl.adoc[]
