From 03643e3c3f99fa3195c5600b20b40bd1b9de29c4 Mon Sep 17 00:00:00 2001
From: Neels Hofmeyr <neels@hofmeyr.de>
Date: Wed, 18 Mar 2020 01:10:42 +0100
Subject: manual: link to new common cs7-config.adoc, remove some dup of that

Related: OS#2767
Change-Id: Ie88dd2c7f7318a31ae04fbd6930346d92141fde5
---
 doc/manuals/chapters/running.adoc | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'doc/manuals/chapters/running.adoc')

diff --git a/doc/manuals/chapters/running.adoc b/doc/manuals/chapters/running.adoc
index 688fbbef2..a3928832b 100644
--- a/doc/manuals/chapters/running.adoc
+++ b/doc/manuals/chapters/running.adoc
@@ -115,9 +115,11 @@ An example configuration of OsmoMSC's SCCP link:
 ----
 cs7 instance 0
  point-code 0.23.1
- asp asp-clnt-OsmoMSC-A-Iu 2905 0 m3ua
+ asp my-OsmoMSC 2905 0 m3ua
   remote-ip 127.0.0.1
   sctp-role client
+ as as-clnt-OsmoMSC-A-Iu m3ua
+  asp my-OsmoMSC
 ----
 
 This configuration is explained in detail in <<cs7_config>>.
-- 
cgit v1.2.3

